Centrality %

0 10 20 30 40 50 60 70 80

(%) D and

〉 ^2 v〈

0

2

4

|>0.7 ηΔ| c <2 GeV/ T 0.15<p Au+Au 200GeV

(a) /2〉 ^2 v〈_2δ 2D