1ηΔ-_2ηΔ 0 0.5 1 1.5 2

{2} 2VΔ

-2 0 2 4 6 8 -4 10× /ndf = 35.4/41 2χ (a)

20-30%_{=0.11ηΔ}^{=0.21ηΔ}

=0.3 1ηΔ =0.4 1ηΔ