hmCentmass8 Entries 9.11355e+07 Mean 1.117 RMS 0.01039

)^2

Mass (GeV/c

1.08 1.1 1.12 1.14

counts

0

2000

4000

6000

310 ×

Λ Λ

Au+Au 200 GeV (0-80%)

Centrality8