0 10 20 30 40

0 20 40 60 80

11.5 GeV

0 10 20 30 40

0 20 40 60 80

7.7 GeV

0 20 40 60 80

〉)ψ - 2 2ϕ + _1ϕ cos( 〈

0

10

20

30

UrQMD opp charge same charge

27 GeV

0 20 40 60 80

〉)ψ - 2 2ϕ + _1ϕ cos( 〈

0

10

20

30 19.6 GeV

MEVSIM

-5 0 5 10 62.4 GeV

opposite charge same charge

-5 0 5 10 39 GeV

Collision centrality (% Most Central)

]〉)_{RP}ψ-2_2ϕ+_1ϕ cos( 〈≡γ [× ^410