Neutral Energy Fraction

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Counts

0

100

200

300

400 310 ×

JP1+JP2 JP1 JP2 Simulation

> = 9.1 GeV/c T<p

Neutral Energy Fraction

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Counts

0 1000

2000

3000

4000 subtr.Tp MIP subtr. Simulation

> = 28.1 GeV/c T<p

STAR 2009

Jet+X → p+p = 200 GeV s