(GeV/c) Tp

2v

0 2 4 6 0

0.1

0.2 -e^+e_± π_0 π

0-20% a) 2 <0.14 GeV/c eeM

0 2 4 6

20-40% b) )^-e^+ simulation (e

0 2 4 6 0

0.1

0.2

40-60% c)

0 2 4 6

20-60% d)