)^2

(GeV/c eeM 0 0.5 1 1.5 2 2.5 3

)^2

(GeV/c eeM 0 1 2 3

]^{-1})^2 Uncorrected dN/dM [(GeV/c

410

610

810 Signal a)

0 0.05 0.1 0.15

610

710

810

)^2

(GeV/c eeM 0 0.5 1 1.5 2 2.5 3

Ratio

-2 10 10 Background

Signal b)