[GeV] NNs 10^210^310

Fε

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

±π-^±π = 0.15-0.6 GeV/c Tk

E895 (-0.6<y<0.6, 7.4-29.7%) CERES (-1<y<-0.5, 10-25%) STAR (-0.5<y<0.5, 10-30%) STAR (-1<y<-0.5, 10-30%) STAR (0.5<y<1, 10-30%)

UrQMD (2+1)D hydro EOS-Q (2+1)D hydro EOS-H (2+1)D hydro EOS-I (2+1)D hydro MC-KLN (2+1)D hydro MC-GLB