100 200 300

100 200 300

5 10 15 20 25 30 35

5 10 15 20 25 30 35 ]^2 [fm o,0 2R

100 200 300

100 200 300

5 10 15 20 25

5 10 15 20 25 ]^2 [fm s,0 2R

100 200 300

100 200 300

10 15 20 25 30

10 15 20 25 30 ]^2 [fm l,0 2R

100 200 300

100 200 300

-1 -0.5 0 0.5 1

-1 -0.5 0 0.5 1 ]^2 [fm os,0 2R

100 200 300

100 200 300

-0.3

-0.2

-0.1 0 0.1

-0.3

-0.2

-0.1 0 0.1 s,0 2/R o,2 2R

100 200 300

100 200 300

-0.05 0 0.05 0.1 0.15

-0.05 0 0.05 0.1 0.15 s,0 2/R s,2 2R

100 200 300

100 200 300

-0.1

-0.05 0 0.05

-0.1

-0.05 0 0.05 l,0 2/R l,2 2R

〉 part N〈 100 200 300

100 200 300

0 0.05 0.1 0.15 0.2

0 0.05 0.1 0.15 0.2 s,0 2/R os,2 2R

100 200 300

100 200 300

-2 -1 0 1 2

-2 -1 0 1 2 ]^2 [fm ol,2 2R 100 200 300

100 200 300

-5 0 5

-5 0 5 ]^2 [fm ol,0 2R 1 2 3 4 5 6 7 8 9 10 1

2

3

4

5

6

7

8

9 Global Fit

-1.0 < y < -0.5 -0.5 < y < 0.5 0.5 < y < 1.0

±π-^±π Au+Au

11.5 GeV