GeV NNs 1 10^210^310^410

)^2 (fm 2 side -R 2 out R

-5

0

5

10

15

20 STAR 0-5% ALICE 0-5% =0.29 GeV/c Tm =0.38 GeV/c Tm =0.46 GeV/c Tm =0.56 GeV/c Tm

=0.26 GeV Tm =0.33 GeV Tm =0.42 GeV Tm =0.52 GeV Tm

GeV NNs 1 10^210^310^410

side /R out R

0.85 0.9 0.95 1 1.05 1.1 1.15 1.2