o = 0 Φ o = 45Φ^o = 90Φ^o = 135Φ

-0.1 0 0.1

) out C(q

0.9 1 1.1 1.2 1.3 1.4 1.5 HHLW Fit (Data)

Global Fit (Data)

-0.1 0 0.1 0.9 1 1.1 1.2 1.3 1.4 1.5

-0.1 0 0.1 0.9 1 1.1 1.2 1.3 1.4 1.5

-0.1 0 0.1 0.9 1 1.1 1.2 1.3 1.4 1.5 19.6 GeV Au+Au

-0.1 0 0.1

) side C(q

0.9 1 1.1 1.2 1.3 1.4 1.5 HHLW Fit (Fit)

Global Fit (Fit)

-0.1 0 0.1 0.9 1 1.1 1.2 1.3 1.4 1.5

-0.1 0 0.1 0.9 1 1.1 1.2 1.3 1.4 1.5

-0.1 0 0.1 0.9 1 1.1 1.2 1.3 1.4 1.5_±π-_±π

10-20%

-0.1 0 0.1

) long C(q

0.9 1 1.1 1.2 1.3 1.4 1.5

-0.1 0 0.1 0.9 1 1.1 1.2 1.3 1.4 1.5

-0.1 0 0.1 0.9 1 1.1 1.2 1.3 1.4 1.5

[GeV/c] iq -0.1 0 0.1 0.9 1 1.1 1.2 1.3 1.4 1.5 < 0.6 GeV/c T 0.15 < k