0 50 100 150

0 50 100 150

λ

0.5 0.55 0.6 0.65 0.7

0.5 0.55 0.6 0.65 0.7 Corrected Uncorrected Global Fit

0 50 100 150

0 50 100 150

]^2 [fm out 2 R

14 15 16 17 18 19 20 21 22

14 15 16 17 18 19 20 21 22

0 50 100 150

0 50 100 150

] ^2 [fm side 2R

10.5 11 11.5 12 12.5 13 13.5 14 14.5

10.5 11 11.5 12 12.5 13 13.5 14 14.5

0 50 100 150

0 50 100 150

]^2 [fm long 2 R

14.5 15 15.5 16 16.5 17

14.5 15 15.5 16 16.5 17

0 50 100 150

0 50 100 150

] ^2 [fm os 2R

-3 -2 -1 0 1 2 3

-3 -2 -1 0 1 2 3

)^o ( EPψ-ϕ 0 50 100 150

0 50 100 150

]^2 [fm ol 2 R

-4 -3 -2 -1 0 1 2 3 4

-4 -3 -2 -1 0 1 2 3 4

20-30% Au+Au

19.6 GeV