|η lepton |

0 0.5 1

-0.5

0

0.5

+W^-W

ν + ^± e

→ ^± W

→p+p_{=510 GeV}

s < 50 GeV e T 25 < E LLA

DSSV08 CHE NLO

STAR Data CL=68% 6.5% beam pol scale uncertainty not shown