M 2σ

10

210 Net-charge Au+Au | < 0.5 η| a)

σS

0 0.2 0.4 0.6 b)

(GeV)

NNs√

56 10 20 30 100 200

2σκ

-15 -10 -5 0 5 c)

0-5% 70-80% 0-5% NBD 70-80% NBD 0-5% Poisson 70-80% Poisson