〉 _{part} N〈

Mean (M)

0 10 20 30 40 Net-Charge Au+Au | < 0.5 η | a)

〉 _{part} N〈 0 100 200 300

Skewness (S)

0

0.1

0.2 c) 〉 _{part} N〈

)σ Std. Deviation (

5 10 15 20 b)

〉 _{part} N〈 0 100 200 300

)κ Kurtosis (

0 0.2 0.4 0.6 0.8 200 GeV

62.4 GeV 39 GeV 27 GeV 19.6 GeV 11.5 GeV 7.7 GeV CLT

d)