0 2 4 6 8 -11 10 -10 10 -910

-810

-710

-610

-510

= 200 GeV NNs |y|<1

2 4 6 8 10 -11 10 -10 10 -910

-810

-710

-610

-510

-510

-410

-310

-210

-110 1 10

STAR Cu+Cu STAR p+p PHENIX p+p

0 2 4 6 8 -11 10 -10 10 -910

-810

-710

-610

STAR Au+Au PHENIX Au+Au

2 4 6 8 10 -11 10 -10 10 -910

-810

-710

-610

-510

Blast Wave =0) β Fit ( Prediction:

=0.41 β 0-60%:

=0.51 β 0-20%:

=0.44 β 20-40%:

=0.28 β 40-60%:

(d) 0-60%

(a) 0-20% (b) 20-40%

(c) 40-60%

(GeV/c) Tp

]^{-2}

) [(GeV/c) T dydp Tpπ N/(2 2Bd

]^2

) [nb/(GeV/c) T dydp

Tpπ/(2σ^2Bd