p_{art} N 0 50 100 150 200 250 300 350

AAR

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 = 200 GeV NNs |y|<1 +X ψ J/ → A+A STAR Au+Au

STAR Cu+Cu PHENIX Au+Au (|y|<0.35) Zhao, Rapp Liu et al.