Fx -0.2 -0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

α

0.7

0.8

0.9

1

1.1

1.2

1.3 = 40 GeV NNs E772 1S (pA), = 40 GeV NNs E772 2S+3S (pA), = 200 GeV NNs STAR 1S+2S+3S (dAu), = 200 GeV NNs STAR 1S (dAu),

(b)