Mass Number (A)

10^210

, /2) pdσA( pAσ

0.5

0.6

0.7

0.8

0.9

1

1.1

1.2

2

ppσA /2 dAσ

scaling

0.96 A

C Ca Fe W Au (a)

= 40 GeV, 0<y<1.05 NNs E772 1S (pA), = 40 GeV, 0<y<1.05 NNs E772 2S+3S (pA), = 200 GeV, |y|<1.0 NNs STAR 1S (dAu),