ϒy -2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

/dy (pb) σd×-_l+_lB (1S+2S+3S), ϒ

0 20 40 60 80 100 120 140 160 180 200 STAR = 200 GeV

NNs_- l^+l→

(1S+2S+3S) ϒ (a)

STAR pp dAu / 1000

PHENIX pp dAu / 1000

R. Vogt

NLO pQCD CEM pp dAu / 1000