/ ndf

2χ 7.337 / 6 θλ 0.3308 ± 0.1451 C 0.020 ± 0.106

θ cos -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

[a.u.] θ dN/dcos

0 0.05 0.1 0.15 0.2 0.25

0.3 / ndf ^2χ 7.337 / 6 ± ± < 3 GeV/c ψJ/ T 2 < p

)θ^2 cos θλ C(1+ uncertainty σ1 θ corrected cos

(a)

/ ndf

2χ 22.61 / 8 θλ 0.1578 ± -0.4764 C 0.0118 ± 0.1091

θ cos -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

[a.u.] θ dN/dcos

0 0.05 0.1 0.15 0.2 0.25^{/ ndf2χ 22.61 / 8} ± ± < 4 GeV/c ψJ/ T 3 < p

)θ^2 cos θλ C(1+ uncertainty σ1 θ corrected cos

(b)

/ ndf

2χ 9.283 / 8 θλ 0.1794 ± -0.6167 C 0.0105 ± 0.1265

θ cos -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1

[a.u.] θ dN/dcos

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 ± ± < 6 GeV/c ψJ/ T 4 < p

)θ^2 cos θλ C(1+ uncertainty σ1 θ corrected cos

(c)