)^2

(GeV/c eeM 2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4

)^2 Counts/(50 MeV/c

0 50 100 150 200 250 300

< 6 GeV/c T 2 < p |y| < 1

= 200 GeV s p+p, (a)

Background

Signal+

background

Like-sign

)^2

(GeV/c eeM 2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4

)^2 Counts/(50 MeV/c

0 50 100 150 200 250 300 Signal ψJ/ Simulation

< 6 GeV/c T 2 < p |y| < 1

= 200 GeV s p+p, (b)