[GeV/c] Tp 5 6 7 8 9 10 11 12

LLA

-0.1

-0.05 0 0.05 0.1 0.15 g = g Δ GRSV g = std Δ GRSV g = -g Δ GRSV DSSV 0π STAR + X 0π→p +p

= 200 GeV s < 2.0 η 0.8 <

6% Scale Uncertainty