[GeV/c] Tp 6 8 10 12 14

Signal Fraction (in peak)

0

0.2

0.4

0.6

0.8

Fx 0.1 0.15 0.2 0.25

Signal Fraction (in peak)

0

0.2

0.4

0.6

0.8

1

Full Data Set Longitudinal Set Transverse Set