]^2

[GeV/c γγM 0 0.05 0.1 0.15 0.2 0.25 0.3

2 Counts per 10 MeV/c

0 1000

2000

3000

4000

5000

STAR data

s^0π Other B.G. Conversion B.G. Template Sum

Residual Signal Region