]^2

[GeV/c γγM 0 0.1 0.2 0.3 0.4 0.5 0.6

Counts per Bin

0

2000

4000

6000 STAR Data Monte Carlo < 8 GeV/c T 7 < p

[GeV] 1 γE 5 10 15 20 25 30

Counts per Bin

0

1000

2000

3000

4000

[GeV] 2 γE 5 10 15 20 25 30

Counts per Bin

0

2000

4000