centrality (%)

0 20 40 60 80 0 20 40 60 80 7.7 GeV

full TPC, re-cent.

-weight ϕ full TPC,

ution (%) centrality (%)

0 20 40 60 80 0 20 40 60 80 11.5 GeV

-sub, re-cent. η -weight ϕ -sub, η

centrality (%)

0 20 40 60 80 0 20 40 60 80 19.6 GeV

0 20 40 60 80 0 20 40 60 80 27 GeV

peripheral central

resol centrality (%)

0 20 40 60 80 0 20 40 60 80 39 GeV

0 20 40 60 80 0 20 40 60 80 62.4 GeV