0 50 100 150 200 250 300 350

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

part N

〉 2 -,UD

A〈δ× _{part}N

Au+Au 200 GeV

correc. ϕ < 0, w/o η > 0, A: η EP: correc. ϕ < 0, with η > 0, A: η EP: