0 100 200 300 400 1.5

2

2.5

part N

〉 2 +,UD

A〈× _{part}N d+Au, Au+Au 200 GeV > 0 η < 0, A: η EP:

< 0 η > 0, A: η EP:

data

data stat+det

stat+det