-0.2 0 0.2 -1 -0.5 0 0.5 1 -3 10×

<2 GeV/c) T (0.15<p

〉)_{EP}ψ-ϕ cos2(

〈 = obs 2v

〉-A_+A〈Δ -〉^2A〈Δ =Δ

Recon. EP Rand. EP

obs 2v^{-3}

10×^{0.2±}

+3.2 -5 10×^{1.4±}1.3 obs 2v^{-3}

10×^{0.2±}

+3.0 -5 10×^{1.1±}

-0.9