0.02 0.04

-0.01

0

0.01

0.02

0.03

〉^{obs}_2v〈

Δ× _{part} N

Au+Au 200 GeV

/ndf=8.6/8

2χ,〉^{obs}_2v〈^{0.02±}0.46

〉^{obs}_2v〈^{0.07±}

+0.60

0.002 ± -0.005 /ndf=3.7/7 2χ

0

1 2 3 4 5 6 7

8