20 40 60 80 0

2

4

6 -3 10×

(degree) wϕΔ Wedge size

Asym. Correl.

20-40% Au+Au 200 GeV 〉_{wϕΔ±o90}^2A〈δ 〉_{wϕΔ±o0}^2A〈δ w ϕΔ±^o90〉-A+A〈δ wϕΔ±^o0〉-A+A〈δ