-0.2 0 0.2 0.8 1 1.2 1.4 1.6 1.8 2 -3 10×

<2 GeV/c) T (0.15<p

〉)_{EP}ψ-ϕ cos2(

〈 = obs 2v

〉-A_+A〈δ

20-40% Au+Au 200 GeV

UD〉_-A_+A〈δ LR〉_-A_+A〈δ