Centrality (%)

Correlation

-10

-5

0

5

10

0 20 40 60 80

opposite charge )>_2Ψ-2_βϕ+_αϕ

<cos( msc THERMINATOR

same charge )>_2Ψ-2_βϕ+_αϕ

<cos( msc THERMINATOR

-4 10 ×