Centrality (%)

〉)_1Ψ -ϕ sin( 〈

-1.5 -1 -0.5 0 0.5 1 1.5 -3 10×

0 10 20 30 40 50 60 70 80

10 20 30 40 50 60 70 80

positive charges negative charges