m_T (GeV/c^2)

R_{out} (fm) R_{side} (fm) R_{long} (fm) λ

(a)

(b)

(c)

(d)

STAR kaon (0-30%) STAR kaon (0-20%) PHENIX kaon (0-30%)

HKM Glauber (0-30%) Buda-Lund (0-30%)

Au+Au Ρs_{NN}=200GeV

3 4 5

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

3 4 5

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

3 4 5

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

0.2 0.4 0.6 0.8

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2