(GeV/c) tp 0 0.5 1 1.5 2

]^{-2} ) [(GeV/c) ηd_tdp_tpπ

N) / (2 2(d

-2 10

-1 10

1 10 210 / ndf

2χ 39.8 / 40 A 11.11±

240.2 T 0.002968 ± 0.2837 ± Cu+Cu 200 GeV 0-10%