〉 _{part} N〈 0 20 40 60 80 100

]^2 [(MeV/c)

〉 _{t, j} pΔ _{t, i} pΔ〈

0 500 1000

1500

2000

2500 Cu+Cu 200 GeV

(a) 〉 _{part} N〈 0 20 40 60 80 100

]^2

[(MeV/c)

〉 _{t, j} pΔ _{t, i} pΔ〈〉_{part}N〈0.5

0

500

1000

1500

2000

2500

0 : 15 ϕΔ_0 : 30 ϕΔ_0 : 60 ϕΔ_0 : 90 ϕΔ_0 : 180 ϕΔ

(b)

Cu+Cu 62.4 GeV

〉 _{part} N〈 0 20 40 60 80 100

]^2

[(MeV/c) 〉_{t, j} pΔ_{t, i} pΔ〈 2 〉 part N〈

0 10000

20000

30000

40000 (c)

〉 _{part} N〈 0 20 40 60 80 100

(%) 〉〉 _t p〈〈 〉 _{t, j} pΔ _{t, i} pΔ〈〉_{part}

0.5N 〈

0

10000

20000

30000

40000 (d)