/ 2 ηΔ 0 0.2 0.4 0.6 0.8 1 1.2

]^2 [(MeV/c)

〉 _{t, j} pΔ _{t, i} pΔ〈

200 400 600 800 1000

1200

1400 0-10%

10-20% 20-30% 30-40% 40-50% 50-60%

(a)

Cu+Cu 200 GeV

/ 2 ηΔ 0 0.2 0.4 0.6 0.8 1 1.2

]^2 [(MeV/c)

〉 _{t, j} pΔ _{t, i} pΔ〈

200 400 600 800 1000

1200

(b)

Cu+Cu 62.4 GeV