(GeV/c)

〉_tp〈

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Number of events

1 10 210 310 410 510

(a)

Data Mixed Γ Cu+Cu 200 GeV 0-10%

(GeV/c)

〉_tp〈

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Number of events

1 10 210 310 410 510

(b)

Cu+Cu 62.4 GeV 0-10%