0 20 40 60 80

0.02

0.04

0.06

0.08^{(a1) 7.7 GeV}

0 20 40 60 80

0.02

0.04

0.06

0.08

(b1) 11.5 GeV

0 20 40 60 80

0.02

0.04

0.06

0.08

(c1) 19.6 GeV

{BBC} 2v {FTPC} 2v 0 20 40 60 80

0.02

0.04

0.06

0.08

(d1) 27 GeV

{2} 2v {4} 2v 0 20 40 60 80

0.02

0.04

0.06

0.08

(e1) 39 GeV

{EP} 2v {EtaSubs} 2v

0 20 40 60 80 0.6 0.8 1 1.2^{{2}}2

(a2) Ratio to v

0 20 40 60 80 0.6 0.8 1 1.2 {2}2

(b2) Ratio to v

0 20 40 60 80 0.6 0.8 1 1.2 {2}2

(c2) Ratio to v

0 20 40 60 80 0.6 0.8 1 1.2 {2}2

(d2) Ratio to v

0 20 40 60 80 0.6 0.8 1 1.2 {2}2

(e2) Ratio to v

% Most Central

2v Ratio