0 1 2 3 0 0.05 0.1 0.15 0.2 (a1) 10 - 20%

0 1 2 3 0 0.05 0.1 0.15 0.2 (b1) 20 - 30%

39 GeV 27 GeV 19.6 GeV

0 1 2 3 0 0.05 0.1 0.15 0.2 (c1) 30 -40%

11.5 GeV 7.7 GeV

0 1 2 3 0.7 0.8 0.9 1 1.1^{(a2) Ratio to 39 GeV}

0 1 2 3 0.7 0.8 0.9 1 1.1 (b2) Ratio to 39 GeV

0 1 2 3 0.7 0.8 0.9 1 1.1 (c2) Ratio to 39 GeV

(GeV/c) Tp

{EtaSubs} 2v Ratio