0 0.5 1 1.5 2

(200 GeV)

2v⁄ _2v

0.6 0.8 1 1.2 1.4 /s=0.08 η (a) MC-Glb, 20-30%^{2.76 TeV}

39 GeV 11.5 GeV 7.7 GeV

0 0.5 1 1.5 2

Resolution

0.6

0.8

1

1.2

1.4 27 GeV 19.6 GeV 11.5 GeV 7.7 GeV

2.76 TeV 62.4 GeV 39 GeV

/s=0.20 η (b) MC-KLN,

(GeV/c) Tp