part N

050100150200250300350

AA R

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

part N 0 50 100 150 200 250 300 350

AA R

00.20.4

0.60.81

1.21.41.6 1.8

part N 0 50 100 150 200 250 300 350

AA R

00.20.4

0.60.81

1.21.41.6 1.8 part N 0 50 100 150 200 250 300 350

AA R

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 0-10%

10-20%

20-30%

30-40%

40-60%

STAR STAR Cu+Cu )>0_Tp

PHENIX ( ±π STAR

Liu et al.

Model I,

Zhao et al.

Model II,

/c GeV >5 Tp 200 GeV Au+Au (a)

part N 0 50 100 150 200 250 300 350

AA R

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 0-10%

10-20%

20-30%

30-40%

40-50%

50-100%

>5 GeV/c T STAR, 200 GeV Au+Au, |y|<1.0, p

>6.5 GeV/c T CMS, 2.76 TeV Pb+Pb, |y|<2.4, 30>p (b)