(GeV/c) Tp 0123456789

AA R

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

(GeV/c) Tp 0123456789

AA R

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

(GeV/c) Tp 0 1 2 3 4 5 6 7 8 9

AA R

0.20.40.6

0.811.21.4

1.61.8

(GeV/c) Tp 0 1 2 3 4 5 6 7 8 9

AA R

0.20.40.6

0.811.21.4

1.61.8

(GeV/c) Tp 0 1 2 3 4 5 6 7 8 9

AA R

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 (a) 0-20% =200 GeV NNs Au+Au

STAR PHENIX

(GeV/c) Tp 0 1 2 3 4 5 6 7 8 9

AA R

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 (b) 20-40%

(GeV/c) Tp 0 1 2 3 4 5 6 7 8 9

AA R

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 (c) 40-60%

Cu+Cu

0-60%

(GeV/c) Tp 0 1 2 3 4 5 6 7 8 9

AA R

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 (d) 0-60% Liu et al.

Model I, Zhao et al.

Model II,