(GeV/c) Tp 0 1 2 3 4 5 6 7 8 9 10

]^{-2} dy) [(GeV/c) Tdp_Tpπ N/(2 2d_{ll}B

-11 10 -10 10 -9 10 -8 10 -7 10 -6 10 -5 10 -4 10 STAR 10× 0-60% 0-20% 20-40%/5 40-60%/10

PHENIX 10× 0-60% 0-20% 20-40%/5 40-60%/10

= 200 GeV NNs +X, ψ J/ → Au+Au (|y|<1)

(|y|<0.35)

=0) β TBW (fix TBW prediction β