(GeV/c) Tp 1 2 3 4 5 6 7 8 9 10 11 12

)ψ ) / (inclusive J/ ψ J/ →B(

0

0.1

0.2

0.3 STAR 2009 STAR PRC80 FONLL+CEM

200 GeV p+p