(GeV/c) Tp 0 2 4 6 8 10 12 14

]^2 dy) [nb/(GeV/c) Tdp_Tpπ/(2σ^2d_{ll}B

-5 10 -4 10 -3 10 -2 10 -1 10 1 10

(GeV/c) Tp 0 2 4 6 8 10 12 14

]^2 dy) [nb/(GeV/c)

Tdp_Tpπ/(2σ^2d_{ll}B

-5 10 -4 10 -3 10 -2 10 -1 10 1 10 STAR 2009, |y|<1.0 STAR PRC80, |y|<1.0 PHENIX PRD82, |y|<0.35

prompt, CEM prompt, NLO NRQCD

= 200 GeV s p+p

0 2 4 6 8 10 12 14 to CEM

Ratio

0 1 2