(rad) ϕ -3 -2 -1 0 1 2 3

Measured Asymmetry

-0.03

-0.02

-0.01 0 0.01

0.02

0.03

0.04

/ ndf

2χ 11.97 / 0 p0 0.003228 ± -0.0003855 p1 0.004638 ± -0.004864 ± ±

2χ 11.97 / 10 ΣA 0.003228 ± TTA 0.004638 ± )ϕ cos(2 TT + A ΣA