]^2

-t [(GeV/c)

0 0.005 0.01 0.015 0.02 0.025

NA

0.01

0.02

0.03

0.04^{/ndf = 2.0/3)} 2χ = 0 ( 5r /ndf = 0.78/3)

2χ (_5 best fitted r